--- ray/src/util/trad.hlp	1995/08/28 10:12:35	2.13
+++ ray/src/util/trad.hlp	1995/10/05 13:03:04	2.16
@@ -1,4 +1,4 @@
-	$Id: trad.hlp,v 2.13 1995/08/28 10:12:35 greg Exp $
+	$Id: trad.hlp,v 2.16 1995/10/05 13:03:04 greg Exp $
 
 This help file is associated with the trad interface to the Radiance
 rad(1) program.  Trad consists of trad.wsh and one do_*.tcl file for
@@ -490,7 +490,7 @@ tot_flux is given in watts.
 (Divide total lumens by 179 lumens/watt to get watts.)
 
 The exposure value may either be given as a positive real value, or
-as a real value preceeded by a '+' or '-' indicating a positive or
+as a real value preceded by a '+' or '-' indicating a positive or
 negative number of f-stops (powers of two) from the original value.
 
 If no exposure is given, pfilt will automatically compute the
@@ -707,7 +707,7 @@ The standard view up vector may be set to the positive
 the positive Y axis (+Y), the positive Z axis (+Z), the negative
 X axis (-X), the negative Y axis (-Y), or the negative Z axis (-Z).
 
-This setting may always be overriden by the "-vu xd yd zd" option,
+This setting may always be overridden by the "-vu xd yd zd" option,
 and will be altered for a particular view if it happens to be
 parallel to the view direction.
 
@@ -1270,6 +1270,8 @@ has completed since the Results screen was brought up.
 
 The "Delete" button on the Results screen is used to remove the
 selected picture files from the filesystem.
+Associated raw picture and z-buffer files
+will also be deleted if they exist.
 Verification is required before any action is taken.
 
 .Results.Display
@@ -1357,10 +1359,13 @@ details.)
 The print command window on the Results screen contains the system
 command to use in printing out finished Radiance pictures.
 The "%s" format field, which must appear somewhere in the command,
-is replaced by the selected Radiance picture file name(s).
+is replaced by the selected Radiance picture file name.
+This command is executed multiple times if multiple files are
+selected.
 
 The default command is "ra_ps %s | lpr", which converts the Radiance
 picture to a black and white PostScript file and sends it to the lpr
 print spooler.
+Add a "-c" option to "ra_ps" if the printer supports color.
 If your printer does not understand PostScript, or your system does
 not support lpr, this command must obviously be changed.
