--- ray/src/util/trad.hlp	1995/01/03 16:11:28	2.9
+++ ray/src/util/trad.hlp	1995/07/06 12:23:37	2.11
@@ -1,4 +1,4 @@
-	$Id: trad.hlp,v 2.9 1995/01/03 16:11:28 greg Exp $
+	$Id: trad.hlp,v 2.11 1995/07/06 12:23:37 greg Exp $
 
 This help file is associated with the trad interface to the Radiance
 rad(1) program.  Trad consists of trad.wsh and one do_*.tcl file for
@@ -745,6 +745,17 @@ to maintain a specific pixel aspect ratio (1 by defaul
 
 The default value for this variable is "512".
 
+.Views.Rawsave
+
+The "Rawsave" check box determines whether or not the raw output picture
+from rpict will be saved.
+The default action (box unchecked) is to remove this file, since it
+takes up disk space and is not generally useful.
+However, if you wish to perform some special filtering function on
+the file, this file can be renamed instead of removed by checking this box.
+The final name in this case will be the same as the finished
+picture, except with a ".rwp" suffix.
+
 .Views.Copy
 
 The "Copy" button in the Views screen permits those variables
@@ -1057,12 +1068,13 @@ command, and new views can be added with the "V name"
 command.
 
 When using the "V" command to change an existing view, do not
-give it a name because the previous view will not be overridden.
+give it an existing name because the previous view will not be overridden.
 Instead, give it a new name (or no name, which will show up as
 a number later), then use the Views screen to override the previous
 view definition with the new one.
-(See the rview(1) man page and the "View" topic in the current
-help category for more information.)
+(See the "View" topic in the current
+help category, the "Change" topic under "Views" and the rview(1)
+manual page for more information.)
 
 If the octree is out-of-date, it will be rebuilt before rendering
 begins.
